         180           8
  0.786690612199345       0.599689433311202       0.418561770900154     
  0.272836183318645       0.137266000802108      -2.230693758496124E-002
 -0.126303459526331      -0.390085679202488     
  -11.8458462985822       -11.6281800201931       -11.2911644489315     
  -10.9492630179695       -10.5654351656062       -10.1346348979431     
  -9.69701108265557       -9.36281646634477     
  4.011488652740043E-004  0.000000000000000E+000
  0.991998980652215       0.000000000000000E+000
  0.994808723760636       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
