         180           8
  0.850274573708026       0.584136488694738       0.405209988162690     
  0.234375676321708       8.966142801221051E-002 -5.201125296669595E-002
 -0.201202273493617      -0.297653659793606     
  -11.9815957704823       -11.7885268018891       -11.4630894519589     
  -11.0773975459341       -10.6380505747469       -10.2134981708825     
  -9.87581484507653       -9.34344633475729     
  3.958257313766807E-004  0.000000000000000E+000
  0.991945333850090       0.000000000000000E+000
  0.994855118054497       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
