         180           8
  0.715391709854336       0.546366279757527       0.392071386026353     
  0.231286674388281       0.102574143221760      -1.519698749037152E-002
 -0.154285362491466      -0.315232673498405     
  -12.0082903544952       -11.8665634931588       -11.5199748135941     
  -11.1327288186285       -10.7225530927840       -10.3279656817305     
  -9.94471647002730       -9.58694907228439     
  3.172919551249380E-004  0.000000000000000E+000
  0.992174795980454       0.000000000000000E+000
  0.995013346127906       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
