         180           8
   3.57183931054607        2.82771909778180        2.15614469423560     
   1.52239261956734       0.884190915659657       0.296877626369128     
 -0.250813229662769      -0.772167600838678     
  -8.68920280667714       -8.89257661181284       -9.14967064072963     
  -9.34655874459451       -9.51702020215524       -9.78187218016893     
  -9.97454540657472       -10.0346231099745     
  8.580180780245690E-005  0.000000000000000E+000
  0.992598398091198       0.000000000000000E+000
  0.995334211534952       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
