         180           8
   3.51424344391588  2.96497414251243  2.41419147025038  1.88980564175019  1.40089060471979  1.01857833437683  0.711099336585214  0.421210130250515
   21.4670985742254  21.6050738193013  21.6373023808913  21.6992085308644  21.7563663432333  21.7942462329983  21.8352964197587  21.9071163338397
  -1.156728100579286E-003  0.000000000000000
   1.00142835996008  0.000000000000000
   0.998514690010816  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
