         180           8
   3.16358580207870        2.34874172685544        1.66525196723426     
  0.978698660948273       0.339559828976993      -0.225176550106063     
 -0.730852490544088       -1.20435833203474     
  -8.02873014390599       -8.23716555363578       -8.43849364120616     
  -8.64589924075776       -8.93500556962630       -9.22234734721429     
  -9.31760577400581       -9.44601160873642     
  3.614667383155086E-004  0.000000000000000E+000
  0.992075443588841       0.000000000000000E+000
  0.994895990134890       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
