         180           8
   3.11887122393870        2.45975746797153        1.87231986487819     
   1.23661109832627       0.608531153007562      -1.118516690628345E-002
 -0.565343073472209       -1.14375116453740     
  -8.12490741276310       -8.20097320408862       -8.29964494872717     
  -8.45373152111862       -8.71398130146820       -8.98711151743441     
  -9.16009489307727       -9.39747595877861     
  3.951483487738694E-004  0.000000000000000E+000
  0.992110246657595       0.000000000000000E+000
  0.994898529451482       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
