         180           8
   1.64666447773581        1.39014130511298        1.18561678738138     
  0.988405004368341       0.825539337752044       0.654709755054836     
  0.497007470021407       0.336707589820840     
  -13.4093862325163       -13.0311214188173       -12.6197225124879     
  -12.2134579990802       -11.7264396648440       -11.2582901993358     
  -10.8289080723594       -10.5222138133037     
  2.685676437952088E-004  0.000000000000000E+000
  0.991997145740738       0.000000000000000E+000
  0.994963269050272       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
