         180           3
   4.88515488069499        6.52963206675655        8.24730646418674     
   18.5309560454164        19.0467191007408        19.8459123701633     
 -1.699254723977194E-003  0.000000000000000E+000
   1.00170603918912       0.000000000000000E+000
  0.998706339604454       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
