         180           8
   1.17299643096005        1.08080908367658       0.931555987698753     
  0.770745809881609       0.580240414596024       0.415370701847678     
  0.297267418494431       0.132305724014951     
  -13.1995101843220       -13.0207097102823       -12.6957465699768     
  -12.3293165521121       -11.8853039084873       -11.4284272101498     
  -10.9945265297573       -10.5263757857325     
  3.017183216335223E-004  0.000000000000000E+000
  0.992050813435095       0.000000000000000E+000
  0.994992356912977       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
