         180           8
   1.46835540410332        1.27218516174891        1.12759401708107     
  0.944997822930903       0.742859053260766       0.614132235298418     
  0.561208610737888       0.417958834906185     
  -13.0317106259172       -12.8079482217944       -12.4868111260797     
  -12.1423140072234       -11.7604664475695       -11.3811067151386     
  -11.0478287334256       -10.5339197589968     
  2.399576898834482E-004  0.000000000000000E+000
  0.992138431610543       0.000000000000000E+000
  0.995054035002645       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
