         180           3
   4.65452248369156        6.34744400604566        8.23814249995577     
   18.5337664381959        19.4935176487979        20.1483650967341     
 -1.666924766043540E-003  0.000000000000000E+000
   1.00149945170438       0.000000000000000E+000
  0.998685056932093       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
