         180           8
   1.41950483152311        1.23854107685344        1.04373647810677     
  0.851648285126906       0.717013835259440       0.582056135492205     
  0.485540959404659       0.219967181348638     
  -13.1498068108886       -12.8050911448172       -12.4310675791067     
  -12.0220390644692       -11.5940749250978       -11.1956835171745     
  -10.8105286695094       -10.4573305376423     
  1.720677346079834E-004  0.000000000000000E+000
  0.992228434494318       0.000000000000000E+000
  0.995160131304163       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
