         180           8
   1.33682017103886        1.09149375447195       0.930688080264547     
  0.759117911743065       0.607664173152057       0.471102385628341     
  0.341117433172117       0.166366373670034     
  -12.8655732957694       -12.6411166649756       -12.3226108321920     
  -11.9653504844306       -11.5449855335251       -11.1523770234232     
  -10.7627661564381       -10.3306263236959     
  1.262483225202284E-004  0.000000000000000E+000
  0.992458533734434       0.000000000000000E+000
  0.995334923448416       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
