         180           8
   1.40789347466603        1.24391541872357        1.05540932324805     
  0.883129361274469       0.745295473359132       0.568790770259469     
  0.433071680670564       0.211411380600622     
  -12.6479772390340       -12.4924413331486       -12.1608223472710     
  -11.7978358586865       -11.4223032431076       -10.9733359674034     
  -10.5809877050782       -10.3310969603686     
  4.280769077017029E-005  0.000000000000000E+000
  0.992623790696970       0.000000000000000E+000
  0.995470679478222       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
