         180           8
   3.45730755340063        2.77114712958450        2.17897912314710     
   1.57178568212387       0.961898653696788       0.382425619248953     
 -0.128238684036086      -0.611636062756907     
  -7.40397301500442       -7.64263442404301       -7.74359084106502     
  -7.93637114368300       -8.19247057686107       -8.49825401066901     
  -8.83522926806402       -9.13368682171871     
  2.397488851151365E-004  0.000000000000000E+000
  0.992596143451074       0.000000000000000E+000
  0.995569555691807       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
