         180           8
   3.49029618578945        2.88219950146710        2.29270768979536     
   1.68365167754449        1.07829172328190       0.523279864896487     
 -1.163525603737809E-002 -0.504363251541424     
  -7.25807086361473       -7.37253088261819       -7.58796470918814     
  -7.78613956446299       -8.07639343007953       -8.43451189046831     
  -8.64933161128932       -8.78817984048599     
  3.349480936496834E-004  0.000000000000000E+000
  0.992400694104431       0.000000000000000E+000
  0.995359293612771       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
