         180           3
   12.9090160183507        10.7401054945815        8.51116258711089     
   20.5146282326668        20.7259322100360        21.6207109392504     
 -1.632063824919163E-003  0.000000000000000E+000
   1.00181974340749       0.000000000000000E+000
  0.999347261875174       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
