         180           3
   6.34566745381531        7.84781245883608        9.63046324771816     
   22.4343325594771        23.1164096542064        23.7767675739896     
 -1.690920233750710E-003  0.000000000000000E+000
   1.00124861667245       0.000000000000000E+000
  0.998731785669686       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
