         180           8
  0.258613228249673       4.101121415321126E-002 -0.111968272097016     
 -0.292811755633690      -0.442929036658752      -0.594356441342629     
 -0.726196029006611      -0.828185399685530     
  -8.88107138119282       -8.62316162428616       -8.29065838974369     
  -7.91261688727440       -7.48286825504126       -7.05002721740721     
  -6.67866695316459       -6.37042832129623     
  8.242944261247940E-004  0.000000000000000E+000
  0.991500389699145       0.000000000000000E+000
  0.994492313547920       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
