         180           3
   6.27602591015698        7.78539295023321        9.65600020476363     
   22.5957497589553        23.2508113252499        23.9524072095009     
 -1.643348263083372E-003  0.000000000000000E+000
   1.00124653550581       0.000000000000000E+000
  0.998650017890049       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
