         180           8
  0.189107557454339      -3.179822611556954E-003 -0.171250547842878     
 -0.335294064082840      -0.506412344110368      -0.634290103770910     
 -0.732645353833216      -0.893942902587993     
  -8.82336218134015       -8.58396714503191       -8.25623353219717     
  -7.88261304609446       -7.44906846407866       -6.99456976254773     
  -6.60621163161842       -6.25034615920096     
  7.825458729221624E-004  0.000000000000000E+000
  0.991719501665442       0.000000000000000E+000
  0.994576695885204       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
