         180           8
   2.13690702760926        1.54771961151002       0.923846495848623     
  0.278522623075666      -0.360119771989966      -0.937091795834088     
  -1.50867488686497       -1.89360489919414     
  -3.17418048029716       -3.19838327461690       -3.34440975825633     
  -3.50354366010614       -3.62636695242146       -3.85504458032315     
  -4.16182917614667       -4.46378958831590     
  1.056471612131972E-003  0.000000000000000E+000
  0.991268166760661       0.000000000000000E+000
  0.993999977192193       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
