         180           8
   2.20439316709921        1.57354340342682       0.917189650117256     
  0.234970277765872      -0.409101416665631       -1.03683045220741     
  -1.59489567850706       -2.17668341833880     
  -3.07158215874140       -3.16970136128659       -3.32101277033499     
  -3.51978590920884       -3.79809683250370       -4.10853011181079     
  -4.35998282171754       -4.61709416608183     
  1.074827699915451E-003  0.000000000000000E+000
  0.991289212732490       0.000000000000000E+000
  0.994054117796125       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
