         180           8
   2.47442785643584        1.80206988070539        1.12827070187081     
  0.480148935466879      -0.147818942218826      -0.710962195387442     
  -1.25600585551520       -1.85511349013719     
  -5.18933704566974       -5.29071587708027       -5.51351091144151     
  -5.76986881265487       -5.97470299863497       -6.14973812445343     
  -6.38052975467895       -6.54282126871042     
  8.777284028813084E-004  0.000000000000000E+000
  0.991461190449930       0.000000000000000E+000
  0.994186918128738       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
