         180           8
   2.33926686353068        1.68131517981937        1.10008711060942     
  0.543470746989517      -8.086917743407668E-002 -0.662970939669796     
  -1.24438300126323       -1.75386415345004     
  -5.90870445183290       -5.96131107967769       -6.07149114207851     
  -6.24900287850694       -6.41923593008029       -6.69588067731404     
  -6.95944229283650       -7.06535631279629     
  8.107060619614236E-004  0.000000000000000E+000
  0.991495912243918       0.000000000000000E+000
  0.994359464854406       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
