         180           8
   2.18222530047540        1.55389195049242       0.921537220262180     
  0.289683825609713      -0.359713610774552      -0.997557960843048     
  -1.50750685099663       -2.09590821224250     
  -5.44553171612035       -5.49636323653617       -5.59085259960240     
  -5.72079199471951       -5.86689580074982       -5.98622831939837     
  -6.08985571366305       -6.34096771153033     
  9.443887330532217E-004  0.000000000000000E+000
  0.991192942012328       0.000000000000000E+000
  0.994128493235315       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
