         180           3
   13.1636510570188        11.0472076689712        9.04599136011531     
   21.7879611786258        21.9002723128444        22.7047862253776     
 -1.645140843280586E-003  0.000000000000000E+000
   1.00165434495533       0.000000000000000E+000
  0.998493908942655       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
