         180           8
   2.94335277292819        2.19566933657133        1.52771105281434     
  0.855514231445884       0.240341843082718      -0.350107783331611     
 -0.891460920636533       -1.37471974223170     
  -6.10489555777310       -6.24467374280625       -6.40514283354246     
  -6.58181122606592       -6.78178212858769       -7.01576105181393     
  -7.15063190273021       -7.12681883521776     
  6.279708360768658E-004  0.000000000000000E+000
  0.991836793762870       0.000000000000000E+000
  0.994569297500240       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
