         180           8
   3.16913241788576        2.52404828737189        1.83500901305795     
   1.17305778492719       0.566912294404970      -1.500734133546397E-002
 -0.555017001427476       -1.11027878556707     
  -6.72525319530414       -6.82999025749857       -6.98974314475411     
  -7.17250022521350       -7.32838276354276       -7.55008012804268     
  -7.73125167506521       -7.81685021421455     
  4.986794058063049E-004  0.000000000000000E+000
  0.992138315205739       0.000000000000000E+000
  0.994881735662488       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
