         180           8
   12.7202175568439        12.1529177478423        11.5887006298923     
   11.0005819487450        10.3892854483141        9.77445329239025     
   9.17883669197161        8.60212677283259     
   21.5892764137165        21.6067151048638        21.6947722211513     
   21.7679678136772        21.9100130564181        22.0489668867237     
   22.2128757491053        22.2614599764734     
 -1.568836401798673E-003  0.000000000000000E+000
   1.00160949089431       0.000000000000000E+000
  0.998908465451314       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
