         180           8
   2.98196270642455        2.29367762189164        1.66724082354929     
   1.06472192877649       0.450288270243075      -0.108457918927630     
 -0.679758860382593       -1.14464451674138     
  -5.75579820621548       -5.88935500555774       -6.08421194301744     
  -6.31241766678731       -6.59718604472729       -6.89309021892280     
  -7.14521513749388       -7.37676892962462     
  4.999705157557749E-004  0.000000000000000E+000
  0.992076484934822       0.000000000000000E+000
  0.994835240098783       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
