         180           8
   3.28188065672872        2.71582281413826        2.03959584725178     
   1.41455123034951       0.830127546519106       0.206282038468880     
 -0.355566477671059      -0.871212833286999     
  -5.85135521083355       -5.85797348081171       -5.99082957922661     
  -6.19330358664500       -6.39574535642371       -6.66258821145587     
  -6.96014088228250       -7.15345795745451     
  4.438065394125240E-004  0.000000000000000E+000
  0.992288660649310       0.000000000000000E+000
  0.995016453368372       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
