         180           3
   12.7052439334783        10.6272525401926        8.45913290989904     
   21.9100199969517        22.5057854637478        22.7954995960935     
 -1.618661171328519E-003  0.000000000000000E+000
   1.00161961981872       0.000000000000000E+000
  0.998914767054505       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
