         180           8
   3.32612168997308        2.56308051225960        1.97238389365440     
   1.33213626959830       0.704251920452062       0.128337320375536     
 -0.425556029865132      -0.872467911236119     
  -5.83465573682300       -5.87674294196577       -5.92823097699305     
  -6.06532012987348       -6.31530566143548       -6.64523861475996     
  -6.89804471499573       -7.22584576827594     
  4.497334837971955E-004  0.000000000000000E+000
  0.992349847876759       0.000000000000000E+000
  0.995115824176027       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
