         180           8
   3.57357521576146        2.82647481852017        2.15458237301398     
   1.51801347847098       0.902262122220676       0.298467733973806     
 -0.275131998267934      -0.780765851532725     
  -4.07032641827302       -4.76526758546466       -5.23052900680613     
  -5.59792929699200       -5.94236406193677       -6.30313747256285     
  -6.62806161258609       -7.07978813960089     
  4.250427166188132E-004  0.000000000000000E+000
  0.992578205991077       0.000000000000000E+000
  0.995515407650255       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
