         180           3
   6.00369408224568        7.45357680161626        9.30517598488399     
   21.6893412845694        22.3754209969703        23.1139879231366     
 -1.664068367974990E-003  0.000000000000000E+000
   1.00131934840737       0.000000000000000E+000
  0.998629977875719       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
