         180           8
  0.502337239759260       0.292199923839168       0.107545133832805     
 -9.689613236080664E-002 -0.286508644102135      -0.442304171224074     
 -0.560141962982688      -0.696654164974797     
  -9.67006843129288       -9.45542311953781       -9.14591421555743     
  -8.77420584831675       -8.36460673921042       -7.96511520711208     
  -7.57077046231037       -7.15989954498539     
  6.948166673105681E-004  0.000000000000000E+000
  0.991924274621952       0.000000000000000E+000
  0.994850276505891       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
