         180           8
  0.139669595564421      -0.120956314222499      -0.307375707524635     
 -0.477663643161471      -0.679981343055823      -0.867168312063272     
 -0.997882504846914       -1.11072570040288     
  -9.22604348435232       -8.91866642719875       -8.58433575461381     
  -8.15498426995622       -7.73872735019001       -7.32167912946354     
  -6.85628812959290       -6.36851818157350     
  9.972105043909000E-004  0.000000000000000E+000
  0.991282934705131       0.000000000000000E+000
  0.994153577331591       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
