         180           3
   6.38480731845374        7.77357019355411        9.56779492638278     
   22.2056111453383        22.7661459327409        23.3823836358309     
 -1.745917867292573E-003  0.000000000000000E+000
   1.00121532086452       0.000000000000000E+000
  0.998514600343017       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
