         180           8
 -7.091849762885317E-002 -0.312545704048308      -0.453727769788008     
 -0.639197307794977      -0.845406181907703      -0.994821011370590     
  -1.08486834235089       -1.20803274304638     
  -9.24833725906458       -9.01866232975186       -8.66578720888149     
  -8.30895047701359       -7.93582628856964       -7.57029285657718     
  -7.17546873268471       -6.60798824271217     
  9.399979521423897E-004  0.000000000000000E+000
  0.991374358449861       0.000000000000000E+000
  0.994129391371433       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
