         180           8
   5.85865193970117        5.22856459529282        4.65413691691200     
   4.12525472190328        3.66000305356247        3.23676834901969     
   2.85896148740326        2.54773232699277     
   21.7956745219093        21.7312170752179        21.7664427281490     
   21.8156551741162        21.8715231824759        21.8830664336062     
   21.8961001372783        21.9834965549518     
 -1.676630744071368E-003  0.000000000000000E+000
   1.00118055716932       0.000000000000000E+000
  0.998114677676829       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
