         180           8
 -0.531221773829258      -0.862976129516027       -1.18520221358877     
  -1.48556310264425       -1.75688742815071       -1.95848990208582     
  -2.09951766318074       -2.24982966884643     
  -10.4924468643462       -10.9399771781239       -11.2344811326765     
  -11.5264195840252       -11.8130081244509       -12.0815748182364     
  -12.3515077127840       -12.6008898295892     
  7.551273279628780E-004  0.000000000000000E+000
  0.991468938428474       0.000000000000000E+000
  0.994311842928920       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
