         180           3
   5.70186208014251        3.81666294681965        2.44126868298211     
   21.5333153467923        21.7515334454710        22.0201830131825     
 -1.710078786004949E-003  0.000000000000000E+000
   1.00108613126252       0.000000000000000E+000
  0.998113644789264       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
