         180           8
 -0.369591206921639      -0.654245387988982       -1.03848507139013     
  -1.36440175567294       -1.64618317642995       -1.87688112936039     
  -2.03403853973922       -2.16920492962456     
  -10.7093664383774       -10.9986638901321       -11.2504629490355     
  -11.5042051748445       -11.7298192959752       -11.9402631644691     
  -12.1679432967695       -12.3367706535694     
  6.813182312106601E-004  0.000000000000000E+000
  0.991586532192601       0.000000000000000E+000
  0.994297438766090       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
