         180           8
 -0.414710573220577      -0.695225666111025       -1.05786426060608     
  -1.36857854922970       -1.65264721225711       -1.85351738663184     
  -2.02372961537844       -2.07001357032787     
  -10.8324117999227       -11.0793120421956       -11.3517381907193     
  -11.6290748131226       -11.9262969816573       -12.1851114588964     
  -12.4074732779592       -12.7495690419819     
  6.475919340892380E-004  0.000000000000000E+000
  0.991636179426136       0.000000000000000E+000
  0.994416716106517       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
