         180           8
 -0.117138742736586      -0.482123515048954      -0.844261316962998     
  -1.18628444216954       -1.49297203907590       -1.69246559844891     
  -1.84150730275368       -1.84170868168561     
  -11.1386854926511       -11.3652789561216       -11.6605484231305     
  -11.9294144533103       -12.2123467346213       -12.3895283927731     
  -12.5979976281685       -12.8680496000180     
  5.598673930132564E-004  0.000000000000000E+000
  0.991766623280223       0.000000000000000E+000
  0.994527834522066       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
