         180           3
   5.01112031533684        3.05926443073355        1.88947555011281     
   21.7134787351956        21.5286162698482        21.8131601949992     
 -1.686642440097254E-003  0.000000000000000E+000
   1.00116784867709       0.000000000000000E+000
  0.998393663365526       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
