         180           8
  0.172825966171145      -0.225622607488062      -0.613672691119975     
 -0.961020974106378       -1.25751060536538       -1.51152616439326     
  -1.69045443231596       -1.87657711497568     
  -11.0717736781165       -11.5261612524960       -11.7772090978252     
  -12.0640032755054       -12.3461073316759       -12.5813844315714     
  -12.8027646489310       -13.0966852177298     
  5.432582433693118E-004  0.000000000000000E+000
  0.991844472995496       0.000000000000000E+000
  0.994738092060088       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
