         180           8
   5.01447784938135        4.38306975283000        3.79656288844000     
   3.25141181132135        2.76347542684478        2.35349693549661     
   1.98102734525835        1.73069730354330     
   21.5717454919994        21.3776228449083        21.2249161602987     
   21.3598068330827        21.5067927900976        21.6166561431138     
   21.9198465049244        22.4298281961585     
 -1.682230625588346E-003  0.000000000000000E+000
   1.00122689051009       0.000000000000000E+000
  0.998474023797949       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
